[#SSL_CTX_set_default_read_buffer_len]
= SSL&lowbar;CTX&lowbar;set&lowbar;default&lowbar;read&lowbar;buffer&lowbar;len
:mrdocs:

Set the default read&hyphen;buffer size used for new connections from a context (pipelining)&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SSL&lowbar;CTX&lowbar;set&lowbar;default&lowbar;read&lowbar;buffer&lowbar;len(
    xref:SSL_CTX.adoc[SSL&lowbar;CTX]* ctx,
    size&lowbar;t len);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *ctx*
| SSL context whose default read buffer length is updated&period;
| *len*
| Desired buffer size in bytes&semi; applied only when larger than the normal default (at least 16704)&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
