[#SSL_CTX_get_default_passwd_cb]
= SSL&lowbar;CTX&lowbar;get&lowbar;default&lowbar;passwd&lowbar;cb
:mrdocs:

Return the default PEM password callback currently set on an SSL context&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:pem_password_cb.adoc[pem&lowbar;password&lowbar;cb]*
SSL&lowbar;CTX&lowbar;get&lowbar;default&lowbar;passwd&lowbar;cb(xref:SSL_CTX.adoc[SSL&lowbar;CTX]* ctx);
----

== Return Value

Password callback, or NULL if none was set explicitly&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *ctx*
| SSL context to query&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
