[#OSSL_sleep]
= OSSL&lowbar;sleep
:mrdocs:

Sleep the calling thread for approximately `millis` milliseconds&period;

== Synopsis

Declared in `&lt;openssl&sol;crypto&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
OSSL&lowbar;sleep(uint64&lowbar;t millis);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *millis*
| Duration to sleep&semi; platforms may round up to their timer resolution&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
