[#OSSL_default_ciphersuites]
= OSSL&lowbar;default&lowbar;ciphersuites
:mrdocs:

Return the built&hyphen;in default TLSv1&period;3 ciphersuite list string&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
char const*
OSSL&lowbar;default&lowbar;ciphersuites();
----

== Return Value

NUL&hyphen;terminated ciphersuite list used when no explicit list is configured&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
