[#OSSL_PARAM_set_all_unmodified]
= OSSL&lowbar;PARAM&lowbar;set&lowbar;all&lowbar;unmodified
:mrdocs:

Clear the modified flag on every element of an OSSL&lowbar;PARAM array&period;

== Synopsis

Declared in `&lt;openssl&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
OSSL&lowbar;PARAM&lowbar;set&lowbar;all&lowbar;unmodified(xref:OSSL_PARAM.adoc[OSSL&lowbar;PARAM]* p);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *p*
| Parameter array terminated by an end sentinel&semi; may be NULL&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
