[#OSSL_PARAM_construct_end]
= OSSL&lowbar;PARAM&lowbar;construct&lowbar;end
:mrdocs:

Construct the terminating OSSL&lowbar;PARAM sentinel for a parameter array&period;

== Synopsis

Declared in `&lt;openssl&sol;params&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:OSSL_PARAM.adoc[OSSL&lowbar;PARAM]
OSSL&lowbar;PARAM&lowbar;construct&lowbar;end();
----

== Return Value

OSSL&lowbar;PARAM with a NULL key that marks the end of an OSSL&lowbar;PARAM list&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
