[#OSSL_CMP_CTX_get0_geninfo_ITAVs]
= OSSL&lowbar;CMP&lowbar;CTX&lowbar;get0&lowbar;geninfo&lowbar;ITAVs
:mrdocs:

Return the geninfo ITAV stack configured on the context&period;

== Synopsis

Declared in `&lt;openssl&sol;cmp&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
stack&lowbar;st&lowbar;OSSL&lowbar;CMP&lowbar;ITAV*
OSSL&lowbar;CMP&lowbar;CTX&lowbar;get0&lowbar;geninfo&lowbar;ITAVs(xref:OSSL_CMP_CTX.adoc[OSSL&lowbar;CMP&lowbar;CTX] const* ctx);
----

== Return Value

Internal ITAV stack, or NULL if empty or unset&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *ctx*
| CMP context&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
