[#OPENSSL_thread_stop]
= OPENSSL&lowbar;thread&lowbar;stop
:mrdocs:

Run per&hyphen;thread OpenSSL cleanup handlers for the calling thread in the default library context&period;

== Synopsis

Declared in `&lt;openssl&sol;crypto&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
OPENSSL&lowbar;thread&lowbar;stop();
----

== Description

Invoked automatically from OPENSSL&lowbar;cleanup() and on thread exit when thread&hyphen;local destructors are active&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
