[#OPENSSL_gmtime]
= OPENSSL&lowbar;gmtime
:mrdocs:

Convert a time&lowbar;t to UTC broken&hyphen;down time into caller&hyphen;provided storage&period;

== Synopsis

Declared in `&lt;openssl&sol;crypto&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
tm*
OPENSSL&lowbar;gmtime(
    time&lowbar;t const* timer,
    tm* result);
----

== Return Value

`result` on success, or NULL on error&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *timer*
| Instant to convert&period;
| *result*
| Destination struct tm (thread&hyphen;safe alternative to gmtime())&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
