[#OPENSSL_cleanup]
= OPENSSL&lowbar;cleanup
:mrdocs:

Deinitialize OpenSSL&colon; run atexit handlers, free global crypto state, and stop threads&period;

== Synopsis

Declared in `&lt;openssl&sol;crypto&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
OPENSSL&lowbar;cleanup();
----

== Description

After this call, most OpenSSL APIs must not be used until the process re&hyphen;initializes&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
