[#OPENSSL_INIT_new]
= OPENSSL&lowbar;INIT&lowbar;new
:mrdocs:

Allocate an OPENSSL&lowbar;INIT&lowbar;SETTINGS object for OPENSSL&lowbar;init&lowbar;crypto()&period;

== Synopsis

Declared in `&lt;openssl&sol;crypto&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:OPENSSL_INIT_SETTINGS.adoc[OPENSSL&lowbar;INIT&lowbar;SETTINGS]*
OPENSSL&lowbar;INIT&lowbar;new();
----

== Return Value

New settings object, or NULL on failure&semi; free with OPENSSL&lowbar;INIT&lowbar;free()&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
