[#OPENSSL_INIT_SETTINGS]
= OPENSSL&lowbar;INIT&lowbar;SETTINGS
:mrdocs:

Opaque OpenSSL library initialization settings passed to OPENSSL&lowbar;init&lowbar;crypto()&period;

== Synopsis

Declared in `&lt;openssl&sol;types&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:ossl_init_settings_st.adoc[ossl&lowbar;init&lowbar;settings&lowbar;st] OPENSSL&lowbar;INIT&lowbar;SETTINGS;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
