[#NCONF_load_bio]
= NCONF&lowbar;load&lowbar;bio
:mrdocs:

Load configuration data from a BIO into a CONF object&period;

== Synopsis

Declared in `&lt;openssl&sol;conf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
NCONF&lowbar;load&lowbar;bio(
    xref:CONF.adoc[CONF]* conf,
    xref:BIO.adoc[BIO]* bp,
    long* eline);
----

== Return Value

1 on success, or 0 on failure&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *conf*
| Destination CONF (typically from NCONF&lowbar;new())&period;
| *bp*
| BIO supplying OpenSSL CONF syntax&period;
| *eline*
| Optional receiver for the error line number on failure, or NULL&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
