[#NCONF_default]
= NCONF&lowbar;default
:mrdocs:

Return the default NCONF&lowbar;METHOD used by NCONF&lowbar;new(NULL)&period;

== Synopsis

Declared in `&lt;openssl&sol;conf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:CONF_METHOD.adoc[CONF&lowbar;METHOD]*
NCONF&lowbar;default();
----

== Return Value

Pointer to the static default configuration method&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
