[#EVP_CIPHER_CTX_original_iv]
= EVP&lowbar;CIPHER&lowbar;CTX&lowbar;original&lowbar;iv
:mrdocs:

Return the IV originally supplied when the cipher context was initialized (deprecated)&period;

== Synopsis

Declared in `&lt;openssl&sol;evp&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;deprecated&rsqb;&rsqb;
unsigned char const*
EVP&lowbar;CIPHER&lowbar;CTX&lowbar;original&lowbar;iv(xref:EVP_CIPHER_CTX.adoc[EVP&lowbar;CIPHER&lowbar;CTX] const* ctx);
----

[WARNING]
====
https://en.cppreference.com/cpp/language/attributes/deprecated[Deprecated^]. Use of this entity is allowed but discouraged.
====
== Return Value

Pointer to the original IV bytes, or NULL if unavailable&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *ctx*
| Cipher context to query&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
