[#ERR_remove_thread_state]
= ERR&lowbar;remove&lowbar;thread&lowbar;state
:mrdocs:

Free the error queue for a thread identifier (deprecated&semi; automatic since 1&period;1&period;0)&period;

== Synopsis

Declared in `&lt;openssl&sol;err&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;deprecated&rsqb;&rsqb;
void
ERR&lowbar;remove&lowbar;thread&lowbar;state(void* tid);
----

[WARNING]
====
https://en.cppreference.com/cpp/language/attributes/deprecated[Deprecated^]. Use of this entity is allowed but discouraged.
====
== Parameters

[cols="1,4"]
|===
| Name| Description
| *tid*
| Opaque thread identifier, or NULL for the current thread&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
