[#ERR_load_PKCS7_strings]
= ERR&lowbar;load&lowbar;PKCS7&lowbar;strings
:mrdocs:

Load PKCS&num;7 library error strings into the error queue (deprecated no&hyphen;op in OpenSSL 3&plus;)&period;

== Synopsis

Declared in `&lt;openssl&sol;cryptoerr&lowbar;legacy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;deprecated&rsqb;&rsqb;
int
ERR&lowbar;load&lowbar;PKCS7&lowbar;strings();
----

[WARNING]
====
https://en.cppreference.com/cpp/language/attributes/deprecated[Deprecated^]. Use of this entity is allowed but discouraged.
====
== Return Value

1&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
