[#DH_OpenSSL]
= DH&lowbar;OpenSSL
:mrdocs:

Return the built&hyphen;in OpenSSL software DH&lowbar;METHOD (deprecated)&period;

== Synopsis

Declared in `&lt;openssl&sol;dh&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;deprecated&rsqb;&rsqb;
xref:DH_METHOD-0a.adoc[DH&lowbar;METHOD] const*
DH&lowbar;OpenSSL();
----

[WARNING]
====
https://en.cppreference.com/cpp/language/attributes/deprecated[Deprecated^]. Use of this entity is allowed but discouraged.
====
== Return Value

Pointer to the default internal Diffie&hyphen;Hellman method table&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
