[#CONF_set_default_method]
= CONF&lowbar;set&lowbar;default&lowbar;method
:mrdocs:

Set the default CONF&lowbar;METHOD used by the legacy CONF&lowbar;load family&period;

== Synopsis

Declared in `&lt;openssl&sol;conf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
CONF&lowbar;set&lowbar;default&lowbar;method(xref:CONF_METHOD.adoc[CONF&lowbar;METHOD]* meth);
----

== Return Value

1 on success, or 0 on error&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *meth*
| Method implementation to install as the process default&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
