[#CONF_get1_default_config_file]
= CONF&lowbar;get1&lowbar;default&lowbar;config&lowbar;file
:mrdocs:

Return a newly allocated path to the default OpenSSL configuration file&period;

== Synopsis

Declared in `&lt;openssl&sol;conf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
char*
CONF&lowbar;get1&lowbar;default&lowbar;config&lowbar;file();
----

== Return Value

Heap string (free with OPENSSL&lowbar;free()), or NULL on failure&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
