[#BIO_set_init]
= BIO&lowbar;set&lowbar;init
:mrdocs:

Mark whether a custom BIO method has completed its create() initialization&period;

== Synopsis

Declared in `&lt;openssl&sol;bio&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
BIO&lowbar;set&lowbar;init(
    xref:BIO.adoc[BIO]* a,
    int init);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *a*
| BIO whose init flag is updated&period;
| *init*
| Non&hyphen;zero after BIO&lowbar;meth create() succeeds&semi; 0 before initialization&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
