[#mp_units-utility-safe_int-0b]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/utility.adoc[utility]::xref:mp_units/utility/safe_int-07.adoc[safe&lowbar;int&lt;T&gt;]
:relfileprefix: ../../
:mrdocs:

Deduces `safe&lowbar;int&lt;T&gt;` (with the default `ErrorPolicy`) from an integral value&period;

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;utility&sol;safe&lowbar;int&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;&sol;&ast; implementation-defined &ast;&sol; T&gt;
xref:mp_units/utility/safe_int-07.adoc[safe&lowbar;int&lt;T&gt;](T) -> xref:mp_units/utility/safe_int-07.adoc[safe&lowbar;int&lt;T&gt;];
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
