[#mp_units-standard_uncertainty-unit]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/standard_uncertainty.adoc[standard&lowbar;uncertainty]::unit
:relfileprefix: ../../
:mrdocs:

The wrapped standard uncertainty unit expression

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;unit&lowbar;definitions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
U unit;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
