[#mp_units-scaled_unit-_mag_]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/scaled_unit.adoc[scaled&lowbar;unit]::&lowbar;mag&lowbar;
:relfileprefix: ../../
:mrdocs:

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;unit&lowbar;definitions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
xref:mp_units/UnitMagnitude.adoc[UnitMagnitude] auto &lowbar;mag&lowbar; = M;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
