[#mp_units-quantity_point-08-point_for-07]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/quantity_point-08.adoc[quantity&lowbar;point]::point&lowbar;for
:relfileprefix: ../../
:mrdocs:

Re&hyphen;expresses this quantity point relative to another point origin that shares the same absolute point origin&period;

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;quantity&lowbar;point&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;&sol;&ast; implementation-defined &ast;&sol; NewPO&gt;
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
constexpr
xref:mp_units/QuantityPointOf.adoc[QuantityPointOf&lt;(NewPO&lcub;&rcub;)&gt;] auto
point&lowbar;for(NewPO new&lowbar;origin) const;
----

== Return Value

This quantity point measured from `new&lowbar;origin`&period;

[NOTE]
====
The return value https://en.cppreference.com/cpp/language/attributes/nodiscard[should not be discarded^].
====
== Parameters

[cols="1,4"]
|===
| Name| Description
| *new&lowbar;origin*
| the point origin to express this quantity point from
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
