[#mp_units-operator_star-0d]
= xref:mp_units.adoc[mp&lowbar;units]::operator&ast;
:relfileprefix: ../
:mrdocs:

Deleted overload rejecting `reference &ast; quantity` in favor of `quantity &ast; reference`

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;reference&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    xref:mp_units/Reference-0ba.adoc[Reference] R,
    typename Q&gt;
requires Quantity&lt;std&colon;&colon;remove&lowbar;cvref&lowbar;t&lt;Q&gt;&gt;
constexpr
auto
operator&ast;(
    R r,
    Q&& q) = delete;
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *r*
| reference operand (unused)
| *q*
| quantity operand (unused)
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
