[#mp_units-basic_fixed_string-08-max_size]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/basic_fixed_string-08.adoc[basic&lowbar;fixed&lowbar;string]::max&lowbar;size
:relfileprefix: ../../
:mrdocs:

The maximum number of characters the string can hold (same as `size`, since the length is fixed)

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;ext&sol;fixed&lowbar;string&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
std::integral&lowbar;constant&lt;size&lowbar;type, N&gt; max&lowbar;size = &lcub;&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
