[#HANDLE_OUTPUT_CONFIG_FLAG]
= HANDLE&lowbar;OUTPUT&lowbar;CONFIG&lowbar;FLAG
:mrdocs:

Expand to a member initializer for one OutputConfig flag&period;

== Synopsis

Declared in `&lt;llvm&sol;Support&sol;VirtualOutputConfig&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define HANDLE&lowbar;OUTPUT&lowbar;CONFIG&lowbar;FLAG(NAME, DEFAULT)

----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *NAME*
| Flag name used as the bitfield member&period;
| *DEFAULT*
| Default value for the flag&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
