[#HANDLE_DIEVALUE_SMALL]
= HANDLE&lowbar;DIEVALUE&lowbar;SMALL
:mrdocs:

Return the stored small DIE value of type `DIE&num;&num;T&period;`

== Synopsis

Declared in `&lt;llvm&sol;CodeGen&sol;DIE&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define HANDLE&lowbar;DIEVALUE&lowbar;SMALL(T)

----

== Return Value

Const reference to the stored `DIE&num;&num;T` value&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *T*
| DIE value type name suffix for the accessor&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
