[#wallet-DEFAULT_KEYPOOL_SIZE]
= xref:wallet.adoc[wallet]::DEFAULT&lowbar;KEYPOOL&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Default for &hyphen;keypool

== Synopsis

Declared in `&lt;wallet&sol;scriptpubkeyman&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;KEYPOOL&lowbar;SIZE = 1000;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
