[#util-LineReader-Consumed]
= xref:util.adoc[util]::xref:util/LineReader.adoc[LineReader]::Consumed
:relfileprefix: ../../
:mrdocs:

Returns number of bytes already read from buffer

== Synopsis

Declared in `&lt;util&sol;string&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t
Consumed() const;
----

== Return Value

The number of bytes already consumed&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
