[#subprocess-SP_MAX_ERR_BUF_SIZ]
= xref:subprocess.adoc[subprocess]::SP&lowbar;MAX&lowbar;ERR&lowbar;BUF&lowbar;SIZ
:relfileprefix: ../
:mrdocs:

Maximum buffer size allocated on the stack when reading an error from a pipe&period;

== Synopsis

Declared in `&lt;util&sol;subprocess&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t SP&lowbar;MAX&lowbar;ERR&lowbar;BUF&lowbar;SIZ = 1024;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
