[#noui_test_redirect]
= noui&lowbar;test&lowbar;redirect
:mrdocs:

Redirect all bitcoind signal handlers to LogInfo&period; Used to check or suppress output during test runs that produce expected errors

== Synopsis

Declared in `&lt;noui&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
noui&lowbar;test&lowbar;redirect();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
