[#noui_reconnect]
= noui&lowbar;reconnect
:mrdocs:

Reconnects the regular Non&hyphen;GUI handlers after having used noui&lowbar;test&lowbar;redirect

== Synopsis

Declared in `&lt;noui&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
noui&lowbar;reconnect();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
