[#node-ImportMempoolOptions-use_current_time]
= xref:node.adoc[node]::xref:node/ImportMempoolOptions.adoc[ImportMempoolOptions]::use&lowbar;current&lowbar;time
:relfileprefix: ../../
:mrdocs:

Use the current time instead of each entry&apos;s stored time&period;

== Synopsis

Declared in `&lt;node&sol;mempool&lowbar;persist&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool use&lowbar;current&lowbar;time = &lcub;false&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
