[#node-BlockManager-m_interrupt]
= xref:node.adoc[node]::xref:node/BlockManager.adoc[BlockManager]::m&lowbar;interrupt
:relfileprefix: ../../
:mrdocs:

Interrupt used to abort long&hyphen;running block&hyphen;loading operations&period;

== Synopsis

Declared in `&lt;node&sol;blockstorage&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:util/SignalInterrupt.adoc[util::SignalInterrupt] const& m&lowbar;interrupt;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
