[#kernel-MemPoolOptions-max_size_bytes]
= xref:kernel.adoc[kernel]::xref:kernel/MemPoolOptions.adoc[MemPoolOptions]::max&lowbar;size&lowbar;bytes
:relfileprefix: ../../
:mrdocs:

Maximum mempool memory usage, in bytes&period;

== Synopsis

Declared in `&lt;kernel&sol;mempool&lowbar;options&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t max&lowbar;size&lowbar;bytes = &lcub;DEFAULT&lowbar;MAX&lowbar;MEMPOOL&lowbar;SIZE&lowbar;MB &ast; 1&apos;000&apos;000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
