[#kernel-MemPoolOptions-check_ratio]
= xref:kernel.adoc[kernel]::xref:kernel/MemPoolOptions.adoc[MemPoolOptions]::check&lowbar;ratio
:relfileprefix: ../../
:mrdocs:

The ratio used to determine how often sanity checks will run&period;

== Synopsis

Declared in `&lt;kernel&sol;mempool&lowbar;options&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int check&lowbar;ratio = &lcub;0&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
