[#kernel-MemPoolLimits-cluster_size_vbytes]
= xref:kernel.adoc[kernel]::xref:kernel/MemPoolLimits.adoc[MemPoolLimits]::cluster&lowbar;size&lowbar;vbytes
:relfileprefix: ../../
:mrdocs:

The maximum allowed size in virtual bytes of a cluster&period;

== Synopsis

Declared in `&lt;kernel&sol;mempool&lowbar;limits&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t cluster&lowbar;size&lowbar;vbytes = &lcub;DEFAULT&lowbar;CLUSTER&lowbar;SIZE&lowbar;LIMIT&lowbar;KVB &ast; 1&apos;000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
