[#init-SetLoggingOptions]
= xref:init.adoc[init]::SetLoggingOptions
:relfileprefix: ../
:mrdocs:

Applies the general logging options (log file, timestamps, thread names, and similar flags) parsed from the arguments to the global logger&period;

== Synopsis

Declared in `&lt;init&sol;common&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SetLoggingOptions(xref:ArgsManager.adoc[ArgsManager] const& args);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *args*
| The parsed program arguments to read the logging options from&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
