[#bitdeque-const_pointer]
= xref:bitdeque.adoc[bitdeque]::const&lowbar;pointer
:relfileprefix: ../
:mrdocs:

Const pointer type, void because individual bits are not addressable&period;

== Synopsis

Declared in `&lt;util&sol;bitdeque&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using const&lowbar;pointer = void;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
