[#arith_uint256-GetLow64]
= xref:arith_uint256.adoc[arith&lowbar;uint256]::GetLow64
:relfileprefix: ../
:mrdocs:

Returns the low 64 bits of the value&period;

== Synopsis

Declared in `&lt;arith&lowbar;uint256&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint64&lowbar;t
GetLow64() const;
----

== Return Value

The least&hyphen;significant 64 bits as an unsigned integer&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
