[#VersionBitsConditionChecker-EndTime]
= xref:VersionBitsConditionChecker.adoc[VersionBitsConditionChecker]::EndTime
:relfileprefix: ../
:mrdocs:

Returns the deployment&apos;s configured timeout time&period;

== Synopsis

Declared in `&lt;versionbits&lowbar;impl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
int64&lowbar;t
EndTime() const override;
----

== Return Value

The deployment&apos;s timeout time&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
