[#V2Transport-MAX_GARBAGE_LEN]
= xref:V2Transport.adoc[V2Transport]::MAX&lowbar;GARBAGE&lowbar;LEN
:relfileprefix: ../
:mrdocs:

Maximum length of the garbage bytes sent before the garbage terminator&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
uint32&lowbar;t MAX&lowbar;GARBAGE&lowbar;LEN = 4095;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
