[#UninterruptibleSleep]
= UninterruptibleSleep
:mrdocs:

Sleep for the given duration without responding to interruption&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
UninterruptibleSleep(std::chrono::microseconds const& n);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *n*
| The duration to sleep for&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
