[#TIMESTAMP_WINDOW]
= TIMESTAMP&lowbar;WINDOW
:mrdocs:

Timestamp window used as a grace period by code that compares external timestamps (such as timestamps passed to RPCs, or wallet key creation times) to block timestamps&period; This should be set at least as high as MAX&lowbar;FUTURE&lowbar;BLOCK&lowbar;TIME&period;

== Synopsis

Declared in `&lt;chain&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int64&lowbar;t TIMESTAMP&lowbar;WINDOW = MAX&lowbar;FUTURE&lowbar;BLOCK&lowbar;TIME;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
