[#SerialTaskRunner-flush]
= xref:SerialTaskRunner.adoc[SerialTaskRunner]::flush
:relfileprefix: ../
:mrdocs:

Processes all remaining queue members on the calling thread, blocking until queue is empty Must be called after the CScheduler has no remaining processing threads!

== Synopsis

Declared in `&lt;scheduler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f951cad8ff8)&rsqb;&rsqb;
virtual
void
flush() override;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
