[#SEQ_ID_BEST_CHAIN_FROM_DISK]
= SEQ&lowbar;ID&lowbar;BEST&lowbar;CHAIN&lowbar;FROM&lowbar;DISK
:mrdocs:

Init values for CBlockIndex nSequenceId when loaded from disk

== Synopsis

Declared in `&lt;chain&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int32&lowbar;t SEQ&lowbar;ID&lowbar;BEST&lowbar;CHAIN&lowbar;FROM&lowbar;DISK = 0;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
