[#RpcInterruptionPoint]
= RpcInterruptionPoint
:mrdocs:

Throw JSONRPCError if RPC is not running

== Synopsis

Declared in `&lt;rpc&sol;server&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
RpcInterruptionPoint();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
