[#PoolResource-ChunkSizeBytes]
= xref:PoolResource.adoc[PoolResource]::ChunkSizeBytes
:relfileprefix: ../
:mrdocs:

Size in bytes to allocate per chunk, currently hardcoded to a fixed size&period;

== Synopsis

Declared in `&lt;support&sol;allocators&sol;pool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
size&lowbar;t
ChunkSizeBytes() const;
----

== Return Value

The size in bytes of each allocated chunk&period;

[NOTE]
====
The return value https://en.cppreference.com/cpp/language/attributes/nodiscard[should not be discarded^].
====

[.small]#Created with https://www.mrdocs.com[MrDocs]#
